%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
%                                                      %
%           Charge Resolution vs ModelTurn             %
%                           Wrriten by K.Fujimoto      %
%                              Date 11/11/2003         %
%                                                      %
%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%

\documentclass[a4paper,10pt]{article} %landscape
\pagestyle{empty}
\begin{document}
Charge Resolution [\%]
\\
\begin{center}
\begin{tabular}{|c|r|r|r|r|r|r|r|r|r|r|r|r|}

\multicolumn{13}{c}{Charge Resolution Amp}\\
\hline
Model Turn & 2000V & Error & 1900V & Error & 1800V & Error & 1700V & Error & 1600V & Error & 1500V & Error \\
\hline\hline
SF0001 & 33.06 & 0.32 & 25.12 & 0.88 & 35.36 & 0.82 & 41.68 & 0.78 &   &   &   &  \\
\hline
SF0004 & 42.62 & 0.40 & 42.68 & 0.37 & 44.05 & 0.37 & 47.15 & 0.51 &   &   &   &  \\
\hline
SF0010 & 21.75 & 0.19 & 26.59 & 0.30 & 31.71 & 0.33 & 36.64 & 0.32 & 37.48 & 0.33 & 42.41 & 0.38 \\
\hline
SF0016 & 25.05 & 0.20 & 30.18 & 0.22 & 40.64 & 0.26 & 43.03 & 0.42 & 46.71 & 0.42 & 50.72 & 0.39 \\
\hline
SF0023 & 28.96 & 0.31 & 29.91 & 0.32 & 31.56 & 0.35 & 33.04 & 0.54 & 34.20 & 0.59 &   &  \\
\hline
SF0030 & 41.49 & 0.43 & 52.79 & 0.94 & 52.23 & 0.81 & 57.98 & 1.16 &   &   &   &  \\
\hline
SF0037 & 26.08 & 0.26 & 31.09 & 0.31 & 31.56 & 0.34 & 33.87 & 0.36 & 38.87 & 0.36 & 41.35 & 0.60 \\
\hline
SF0043 & 21.56 & 0.25 & 25.14 & 0.26 & 28.72 & 0.65 & 30.67 & 0.41 & 33.73 & 0.41 & 37.03 & 0.68 \\
\hline
SF0050 &   &   &   &   & 21.74 & 0.51 & 18.28 & 0.20 & 22.16 & 0.22 & 30.50 & 0.78 \\
\hline
SF0056 & 21.44 & 0.76 & 24.83 & 0.24 & 31.09 & 0.28 & 39.87 & 0.40 & 43.60 & 0.45 & 50.70 & 0.52 \\
\hline
SF0067 & 30.86 & 0.75 & 21.33 & 0.31 & 21.11 & 0.30 & 25.66 & 0.38 & 30.57 & 0.46 & 32.45 & 0.41 \\
\hline
SF0070 & 25.30 & 0.61 & 26.61 & 0.38 & 29.31 & 0.36 & 33.48 & 0.46 & 34.41 & 0.60 & 38.41 & 0.59 \\
\hline
SF0080 & 26.52 & 0.27 & 26.95 & 0.27 & 32.70 & 0.42 & 39.69 & 0.36 & 38.93 & 0.37 & 45.44 & 0.37 \\
\hline
SF0086 &   &   & 19.77 & 0.58 & 22.38 & 0.33 & 25.70 & 0.41 & 33.68 & 0.58 & 31.73 & 0.52 \\
\hline
\end{tabular}
\end{center}

%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%%
\begin{center}
\begin{tabular}{|c|r|r|r|r|r|r|r|r|r|r|r|r|}

\multicolumn{13}{c}{Charge Rexolution No Amp} \\
\hline
Model Turn & 2000V & Error & 1900V & Error & 1800V & Error & 1700V & Error & 1600V & Error & 1500V & Error \\
\hline
SF0001 & 27.46 & 0.86 & 27.21 & 0.83 &   &   &   &   &   &   &   & \\ 
\hline
SF0004 & 42.54 & 0.79 &   &   &   &   &   &   &   &   &   &  \\
\hline
SF0010 & 32.75 & 0.49 & 36.02 & 0.28 & 31.88 & 0.37 & 26.70 & 1.02 & 58.18 & 1.14 &   & \\
\hline
SF0016 & 41.12 & 0.54 & 41.58 & 0.58 & 40.11 & 0.57 & 35.35 & 0.72 & 63.45 & 0.98 &   & \\
\hline
SF0023 & 29.76 & 0.70 & 26.35 & 0.66 & 42.68 & 0.43 & 37.63 & 1.12 &   &   &   & \\
\hline
SF0030 & 35.96 & 0.46 & 39.41 & 1.26 &   &   &   &   &   &   &   & \\
\hline
SF0037 & 33.64 & 0.49 & 31.83 & 0.49 & 28.98 & 0.44 & 33.03 & 0.47 & 59.20 & 1.19 &   & \\
\hline
SF0043 & 31.00 & 0.60 & 30.03 & 0.61 & 28.50 & 0.39 & 25.89 & 0.85 & 44.19 & 1.28 &   & \\
\hline
SF0050 & 24.97 & 0.31 & 25.99 & 0.34 & 26.53 & 0.34 & 26.97 & 0.37 & 27.54 & 0.47 & 27.00 & 0.44 \\
\hline
SF0056 & 41.77 & 0.41 & 43.56 & 0.85 & 40.96 & 0.89 & 41.71 & 1.10 &   &   &   &  \\
\hline
SF0067 & 30.94 & 0.28 & 28.52 & 0.41 & 30.66 & 0.45 & 29.29 & 0.65 & 28.50 & 0.63 & 35.02 & 0.68 \\
\hline
SF0070 & 38.65 & 0.52 & 38.93 & 0.70 & 35.30 & 0.72 & 36.82 & 0.56 & 31.05 & 0.75 & 48.06 & 1.45 \\
\hline
SF0080 & 35.86 & 1.09 & 38.65 & 0.54 & 35.54 & 1.24 & 36.28 & 1.01 & 32.09 & 1.10 & 66.68 & 3.46 \\
\hline
SF0086 & 32.18 & 0.29 & 31.67 & 0.47 & 30.81 & 0.72 & 30.47 & 0.66 & 30.58 & 0.56 & 41.61 & 1.15 \\
\hline
\end{tabular}
\end{center}
\end{document}